20

28

18

14

Neutron one-particle levels of 42Si in W-S potential

V_{WS} = − 40.0 MeV R = 4.41 fm

Ω^π=1/2^± Ω^π=3/2^± Ω^π=5/2^± Ω^π=7/2^±

1f_{5/2}

2p_{1/2} 2p_{3/2} 1f_{7/2}

1d_{3/2} 2s_{1/2}

-0.6 -0.4 -0.2 0.0 0.2 0.4 0.6 -10 -8 -6 -4 -2 0 2 4 6 8 β

β ε_Ω (MeV)

ε_Ω (MeV)